-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.93


######### Lightcurve features #########

amplitude  =  0.290973642718
cusum  =  0.0896605199632
eta  =  0.594640956894
hl_amp_ratio  =  0.557464183893
kurtosis  =  -0.844215861008
n_points  =  391
period  =  0.575795283188
period_SNR  =  47.2217427866
period_log10FAP  =  -52.9593410511
period_uncertainty  =  0.000110298570522
phase_cusum  =  0.273075410186
phase_eta  =  0.22105275141
phi21  =  -2.21953842558
phi31  =  -4.31979845288
quartile31  =  0.475
r21  =  0.42739453303
r31  =  0.271630022088
shapiro_w  =  0.91073423624
skewness  =  -0.562942985049
slope_per10  =  -0.0869949105526
slope_per90  =  0.186999995882
stetson_k  =  0.851371022822
weighted_mean  =  15.2031434164
weighted_std  =  0.273407849247
