-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.205734641254
cusum  =  0.161652007261
eta  =  0.603016786531
hl_amp_ratio  =  0.494602058264
kurtosis  =  -0.611123447895
n_points  =  324
period  =  0.633735397308
period_SNR  =  42.0892947932
period_log10FAP  =  -36.6054571331
period_uncertainty  =  0.000137589107073
phase_cusum  =  0.250525562493
phase_eta  =  0.154047148945
phi21  =  3.80145100934
phi31  =  5.13363595162
quartile31  =  0.32
r21  =  0.498614868815
r31  =  0.373568605495
shapiro_w  =  0.93687915802
skewness  =  -0.614061120054
slope_per10  =  -0.170947013567
slope_per90  =  0.206313069376
stetson_k  =  0.790975555746
weighted_mean  =  12.379088932
weighted_std  =  0.199482361811
