-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.41


######### Lightcurve features #########

amplitude  =  0.867842619686
cusum  =  0.115590709553
eta  =  1.40212709329
hl_amp_ratio  =  0.202401576289
kurtosis  =  2.02105794171
n_points  =  71
period  =  0.79634783013
period_SNR  =  10.0775699966
period_log10FAP  =  -0.785228685171
period_uncertainty  =  0.000205689606658
phase_cusum  =  0.233733062486
phase_eta  =  0.962685509374
phi21  =  0.238806390988
phi31  =  1.75345680036
quartile31  =  0.565
r21  =  0.0896381356053
r31  =  0.440187619949
shapiro_w  =  0.739947795868
skewness  =  -1.73923251745
slope_per10  =  -0.284333337719
slope_per90  =  0.664849965833
stetson_k  =  0.55663051992
weighted_mean  =  15.8603615875
weighted_std  =  0.833954468444
