-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.351289776409
cusum  =  0.091984155307
eta  =  0.684373181435
hl_amp_ratio  =  0.357798176188
kurtosis  =  -0.55239295008
n_points  =  386
period  =  0.592952459925
period_SNR  =  53.0499734598
period_log10FAP  =  -47.2277276221
period_uncertainty  =  0.000117346622432
phase_cusum  =  0.220843411283
phase_eta  =  0.156968529745
phi21  =  0.882224415627
phi31  =  2.03784612981
quartile31  =  0.4
r21  =  0.484896883866
r31  =  0.316888986875
shapiro_w  =  0.90989202261
skewness  =  -0.743573019345
slope_per10  =  -0.123881440876
slope_per90  =  0.199650104102
stetson_k  =  0.742146057742
weighted_mean  =  13.5159702329
weighted_std  =  0.286671281362
