<html><head><meta name="color-scheme" content="light dark"></head><body><pre style="word-wrap: break-word; white-space: pre-wrap;">-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.95


######### Lightcurve features #########

amplitude  =  0.389038652527
cusum  =  0.0918245339711
eta  =  0.567613802283
hl_amp_ratio  =  0.33668309051
kurtosis  =  -0.248883019357
n_points  =  379
period  =  0.488271803179
period_SNR  =  50.0832952878
period_log10FAP  =  -53.5587799911
period_uncertainty  =  6.71514759661e-05
phase_cusum  =  0.285557286004
phase_eta  =  0.0215660173333
phi21  =  0.667148761903
phi31  =  -1.55356065413
quartile31  =  0.435
r21  =  0.438068510812
r31  =  0.339708596465
shapiro_w  =  0.857166647911
skewness  =  -0.968175390074
slope_per10  =  -0.147397255414
slope_per90  =  0.252174041634
stetson_k  =  0.720811319695
weighted_mean  =  14.276254417
weighted_std  =  0.326421711556
</pre></body></html>