-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.347177539351
cusum  =  0.103290340117
eta  =  0.512237442874
hl_amp_ratio  =  0.232258919101
kurtosis  =  -0.518830030086
n_points  =  390
period  =  0.619314716733
period_SNR  =  42.0041643595
period_log10FAP  =  -45.1961470106
period_uncertainty  =  0.000106962821152
phase_cusum  =  0.2238287902
phase_eta  =  0.218388076217
phi21  =  3.86313306652
phi31  =  4.83492213979
quartile31  =  0.3975
r21  =  0.426245775908
r31  =  0.271781288908
shapiro_w  =  0.847411930561
skewness  =  -0.913206683467
slope_per10  =  -0.100524065348
slope_per90  =  0.215066658954
stetson_k  =  0.708780205831
weighted_mean  =  15.1697474041
weighted_std  =  0.314578240344
