-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.96


######### Lightcurve features #########

amplitude  =  0.302975306093
cusum  =  0.141001774377
eta  =  0.552067603712
hl_amp_ratio  =  0.46932651894
kurtosis  =  -1.16963188418
n_points  =  283
period  =  0.645353757439
period_SNR  =  36.9239370826
period_log10FAP  =  -38.6279769033
period_uncertainty  =  0.000117090096857
phase_cusum  =  0.251242777911
phase_eta  =  0.0354618167997
phi21  =  0.629828458285
phi31  =  -1.35837413679
quartile31  =  0.49
r21  =  0.433701465108
r31  =  0.387199621059
shapiro_w  =  0.912423729897
skewness  =  -0.415787309466
slope_per10  =  -0.193568729728
slope_per90  =  0.474411476914
stetson_k  =  0.830528112212
weighted_mean  =  13.7643718721
weighted_std  =  0.271676802758
