-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.75


######### Lightcurve features #########

amplitude  =  0.20212992
cusum  =  0.147158238537
eta  =  0.787368677128
hl_amp_ratio  =  0.344202858427
kurtosis  =  -0.752779611635
n_points  =  140
period  =  0.740314866573
period_SNR  =  24.5213702202
period_log10FAP  =  -15.5611082389
period_uncertainty  =  0.000259987691714
phase_cusum  =  0.244609336933
phase_eta  =  0.149516089416
phi21  =  4.12695061394
phi31  =  5.46354308903
quartile31  =  0.23
r21  =  0.430562319576
r31  =  0.246742687646
shapiro_w  =  0.906656444073
skewness  =  -0.682296420095
slope_per10  =  -0.379052621218
slope_per90  =  0.562461798467
stetson_k  =  0.709747757835
weighted_mean  =  15.1549724353
weighted_std  =  0.165071430889
