-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.99


######### Lightcurve features #########

amplitude  =  0.18884765851
cusum  =  0.190577955077
eta  =  0.672529327275
hl_amp_ratio  =  1.1187583947
kurtosis  =  -0.690674411282
n_points  =  271
period  =  0.713230524035
period_SNR  =  40.7805749046
period_log10FAP  =  -36.0618231729
period_uncertainty  =  0.000174925744017
phase_cusum  =  0.240462442547
phase_eta  =  0.173530375438
phi21  =  1.21567862064
phi31  =  -0.444886499359
quartile31  =  0.24
r21  =  0.433162663354
r31  =  0.253097258482
shapiro_w  =  0.986524581909
skewness  =  0.0976068269255
slope_per10  =  -0.313589586297
slope_per90  =  0.292972950758
stetson_k  =  0.827759720876
weighted_mean  =  13.6030895511
weighted_std  =  0.149729619613
