-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.28


######### Lightcurve features #########

amplitude  =  0.264521041023
cusum  =  0.14984509824
eta  =  1.33605218732
hl_amp_ratio  =  0.998017663484
kurtosis  =  -0.313607608773
n_points  =  254
period  =  1.53423304019
period_SNR  =  12.2879880917
period_log10FAP  =  -3.37250608155
period_uncertainty  =  0.000994533503592
phase_cusum  =  0.173799527656
phase_eta  =  1.49204001184
phi21  =  0.644748920321
phi31  =  3.0970453757
quartile31  =  0.645
r21  =  0.471749566043
r31  =  0.318671354473
shapiro_w  =  0.995565235615
skewness  =  0.0895898502743
slope_per10  =  -0.0738063673246
slope_per90  =  0.105861734042
stetson_k  =  0.81878519295
weighted_mean  =  15.4962704201
weighted_std  =  0.441706826363
