-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.84


######### Lightcurve features #########

amplitude  =  0.364215132406
cusum  =  0.110955793402
eta  =  0.669177010152
hl_amp_ratio  =  0.417423555086
kurtosis  =  -1.04354040736
n_points  =  287
period  =  0.616576531305
period_SNR  =  39.0513622038
period_log10FAP  =  -34.9465542365
period_uncertainty  =  0.000174482230119
phase_cusum  =  0.277332049016
phase_eta  =  0.0857397901961
phi21  =  0.703566463113
phi31  =  1.88839759675
quartile31  =  0.61
r21  =  0.474044921228
r31  =  0.373358621378
shapiro_w  =  0.913269579411
skewness  =  -0.51099979276
slope_per10  =  -0.144139721831
slope_per90  =  0.351851279235
stetson_k  =  0.778547190493
weighted_mean  =  13.418842188
weighted_std  =  0.353582369716
