-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.99


######### Lightcurve features #########

amplitude  =  0.310113746763
cusum  =  0.159572187979
eta  =  0.673455933548
hl_amp_ratio  =  0.53776042537
kurtosis  =  -0.853203009835
n_points  =  244
period  =  0.574114285996
period_SNR  =  31.5646359013
period_log10FAP  =  -25.2721291817
period_uncertainty  =  0.000113326945496
phase_cusum  =  0.286754462935
phase_eta  =  0.494032326252
phi21  =  -2.46724132429
phi31  =  -4.79179844903
quartile31  =  0.5425
r21  =  0.512914560847
r31  =  0.292928504734
shapiro_w  =  0.946929633617
skewness  =  -0.445048507084
slope_per10  =  -0.17238981759
slope_per90  =  0.180069919479
stetson_k  =  0.781899374998
weighted_mean  =  15.9100632887
weighted_std  =  0.309538946773
