-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.94


######### Lightcurve features #########

amplitude  =  0.242239662496
cusum  =  0.161557196528
eta  =  0.443558889812
hl_amp_ratio  =  0.650311739341
kurtosis  =  -0.939352450277
n_points  =  316
period  =  0.68147555572
period_SNR  =  38.1004748294
period_log10FAP  =  -41.0195318065
period_uncertainty  =  0.000126077772906
phase_cusum  =  0.278948131169
phase_eta  =  0.0413776371392
phi21  =  1.14490425761
phi31  =  -0.551834202586
quartile31  =  0.28
r21  =  0.506446110206
r31  =  0.302719501221
shapiro_w  =  0.937910854816
skewness  =  -0.433881376619
slope_per10  =  -0.221558162952
slope_per90  =  0.519649774017
stetson_k  =  0.849130372289
weighted_mean  =  13.6201997256
weighted_std  =  0.191182332619
