<html><head><meta name="color-scheme" content="light dark"></head><body><pre style="word-wrap: break-word; white-space: pre-wrap;">-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.264563728303
cusum  =  0.0693583920571
eta  =  0.595150179487
hl_amp_ratio  =  0.374017234868
kurtosis  =  0.0164821471898
n_points  =  529
period  =  0.593697367487
period_SNR  =  55.2477332373
period_log10FAP  =  -60.5460063262
period_uncertainty  =  9.4112196723e-05
phase_cusum  =  0.200466154006
phase_eta  =  0.443322315321
phi21  =  0.753087830135
phi31  =  -1.41324685919
quartile31  =  0.29
r21  =  0.435797047098
r31  =  0.281067100642
shapiro_w  =  0.912578701973
skewness  =  -0.913380338598
slope_per10  =  -0.0537916448273
slope_per90  =  0.118099208588
stetson_k  =  0.741837606136
weighted_mean  =  13.3531529859
weighted_std  =  0.222119164755
</pre></body></html>