-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.99


######### Lightcurve features #########

amplitude  =  0.351294147111
cusum  =  0.193870579296
eta  =  0.633335702333
hl_amp_ratio  =  0.482115455303
kurtosis  =  -0.516497405539
n_points  =  192
period  =  0.561008351231
period_SNR  =  29.6445688473
period_log10FAP  =  -20.0079971187
period_uncertainty  =  0.000126255743746
phase_cusum  =  0.343803933519
phase_eta  =  0.34296593208
phi21  =  -2.28051938281
phi31  =  -4.71846211328
quartile31  =  0.5025
r21  =  0.433328720985
r31  =  0.292063842678
shapiro_w  =  0.91600728035
skewness  =  -0.742494727546
slope_per10  =  -0.120417225972
slope_per90  =  0.242398136475
stetson_k  =  0.761598308416
weighted_mean  =  13.112165588
weighted_std  =  0.350863725391
