-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  DSCT
class_probability =  0.28


######### Lightcurve features #########

amplitude  =  0.251263499639
cusum  =  0.122333102032
eta  =  1.34239560548
hl_amp_ratio  =  1.74273623465
kurtosis  =  1.31380656773
n_points  =  173
period  =  0.0695217884199
period_SNR  =  10.9600299353
period_log10FAP  =  -2.82677579367
period_uncertainty  =  1.38781280276e-06
phase_cusum  =  0.157958418916
phase_eta  =  1.35652873871
phi21  =  2.65994039361
phi31  =  2.67165432316
quartile31  =  0.53
r21  =  0.349171448156
r31  =  0.476649553475
shapiro_w  =  0.952957332134
skewness  =  0.787828067939
slope_per10  =  -0.00931116408267
slope_per90  =  0.00679462332109
stetson_k  =  0.747704944505
weighted_mean  =  11.1816184971
weighted_std  =  0.398947653431
