-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.245342813387
cusum  =  0.114559892988
eta  =  0.541335668971
hl_amp_ratio  =  0.52572991753
kurtosis  =  -0.707958219465
n_points  =  508
period  =  0.655270695247
period_SNR  =  33.184273514
period_log10FAP  =  -60.4228596532
period_uncertainty  =  0.000121301502555
phase_cusum  =  0.242916042694
phase_eta  =  0.432226732457
phi21  =  1.14466795279
phi31  =  5.47039438419
quartile31  =  0.3425
r21  =  0.395937841633
r31  =  0.216041027096
shapiro_w  =  0.950238764286
skewness  =  -0.468118851041
slope_per10  =  -0.0645948804569
slope_per90  =  0.0613368294442
stetson_k  =  0.791519940003
weighted_mean  =  16.0090362065
weighted_std  =  0.214626139852
