-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.92


######### Lightcurve features #########

amplitude  =  0.266744785129
cusum  =  0.131147507869
eta  =  0.504062561926
hl_amp_ratio  =  0.628256899663
kurtosis  =  -1.15241851328
n_points  =  405
period  =  0.617465212013
period_SNR  =  49.8405085686
period_log10FAP  =  -55.6497949513
period_uncertainty  =  0.000106093682047
phase_cusum  =  0.243703134011
phase_eta  =  0.210922413355
phi21  =  -2.18336883
phi31  =  -4.0040328718
quartile31  =  0.39
r21  =  0.450669060969
r31  =  0.309646028553
shapiro_w  =  0.927948236465
skewness  =  -0.376477626006
slope_per10  =  -0.132326584679
slope_per90  =  0.169418545097
stetson_k  =  0.843097447546
weighted_mean  =  15.6996121328
weighted_std  =  0.230161955829
