<html><head><meta name="color-scheme" content="light dark"></head><body><pre style="word-wrap: break-word; white-space: pre-wrap;">-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.97


######### Lightcurve features #########

amplitude  =  0.355037030862
cusum  =  0.109952497619
eta  =  0.47061025182
hl_amp_ratio  =  0.342282402685
kurtosis  =  0.34022529024
n_points  =  293
period  =  0.593440846064
period_SNR  =  35.9777525359
period_log10FAP  =  -36.4583466791
period_uncertainty  =  9.60322449647e-05
phase_cusum  =  0.23261566756
phase_eta  =  0.156173832784
phi21  =  3.85856423997
phi31  =  4.83039165358
quartile31  =  0.39
r21  =  0.459960057103
r31  =  0.252925017697
shapiro_w  =  0.866550564766
skewness  =  -1.11266704838
slope_per10  =  -0.165185636401
slope_per90  =  0.302406400936
stetson_k  =  0.687077142101
weighted_mean  =  14.7019257476
weighted_std  =  0.283151855582
</pre></body></html>