-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.99


######### Lightcurve features #########

amplitude  =  0.320264438522
cusum  =  0.153226439406
eta  =  0.442601249377
hl_amp_ratio  =  0.411203828567
kurtosis  =  -0.887460511739
n_points  =  270
period  =  0.597504699333
period_SNR  =  36.6967972272
period_log10FAP  =  -31.8725763881
period_uncertainty  =  0.000102664040596
phase_cusum  =  0.259794024789
phase_eta  =  0.403094608121
phi21  =  0.76905709154
phi31  =  1.81847867221
quartile31  =  0.5
r21  =  0.487167931106
r31  =  0.223360370638
shapiro_w  =  0.911545872688
skewness  =  -0.615168622564
slope_per10  =  -0.124993963909
slope_per90  =  0.224740000442
stetson_k  =  0.752804572424
weighted_mean  =  14.8379597205
weighted_std  =  0.303328922289
