-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.91


######### Lightcurve features #########

amplitude  =  0.334235733003
cusum  =  0.257140424352
eta  =  0.738937603359
hl_amp_ratio  =  0.500200926501
kurtosis  =  0.479949953363
n_points  =  119
period  =  0.650281564138
period_SNR  =  16.8141199366
period_log10FAP  =  -8.46728722912
period_uncertainty  =  0.000179421026801
phase_cusum  =  0.231073167048
phase_eta  =  0.48458644934
phi21  =  -2.66953842069
phi31  =  -4.40870906798
quartile31  =  0.305
r21  =  0.314029357195
r31  =  0.17264766811
shapiro_w  =  0.928620934486
skewness  =  -0.742718274019
slope_per10  =  -0.267715173574
slope_per90  =  0.426000007428
stetson_k  =  0.733953581663
weighted_mean  =  8.85470588235
weighted_std  =  0.209921247856
