-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.91


######### Lightcurve features #########

amplitude  =  0.276166855489
cusum  =  0.166302195541
eta  =  0.481108085499
hl_amp_ratio  =  0.662599987179
kurtosis  =  -0.672380161987
n_points  =  130
period  =  0.701637203962
period_SNR  =  13.8355403785
period_log10FAP  =  -11.337809294
period_uncertainty  =  0.00010530349989
phase_cusum  =  0.24182089399
phase_eta  =  0.0903600534359
phi21  =  -2.01798102741
phi31  =  -3.95091249126
quartile31  =  0.27
r21  =  0.539243261884
r31  =  0.29454673729
shapiro_w  =  0.940276503563
skewness  =  -0.534284528286
slope_per10  =  -0.454599987715
slope_per90  =  0.771805068898
stetson_k  =  0.811397708393
weighted_mean  =  15.0403692477
weighted_std  =  0.212548151683
