-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.99


######### Lightcurve features #########

amplitude  =  0.163216112048
cusum  =  0.200391039755
eta  =  0.63880693198
hl_amp_ratio  =  0.657136104078
kurtosis  =  -0.793631472876
n_points  =  272
period  =  0.575437876762
period_SNR  =  39.4339769595
period_log10FAP  =  -34.3236610094
period_uncertainty  =  0.000152363252685
phase_cusum  =  0.242770514322
phase_eta  =  0.399007116183
phi21  =  -2.08819783875
phi31  =  -0.994295529904
quartile31  =  0.24
r21  =  0.461795068961
r31  =  0.14722295989
shapiro_w  =  0.961034595966
skewness  =  -0.379774646826
slope_per10  =  -0.154427194108
slope_per90  =  0.168376129053
stetson_k  =  0.811346809893
weighted_mean  =  13.0794491745
weighted_std  =  0.141952708485
