-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.196637831205
cusum  =  0.16749228392
eta  =  0.573153762931
hl_amp_ratio  =  0.642376172487
kurtosis  =  -0.825850351389
n_points  =  233
period  =  0.624140842037
period_SNR  =  34.2184838299
period_log10FAP  =  -27.7980844175
period_uncertainty  =  0.000156269624529
phase_cusum  =  0.226720414181
phase_eta  =  0.392841664608
phi21  =  -1.8934884221
phi31  =  -3.9163879383
quartile31  =  0.3
r21  =  0.390455986083
r31  =  0.257026345559
shapiro_w  =  0.964837014675
skewness  =  -0.355222644913
slope_per10  =  -0.13915185556
slope_per90  =  0.216749997344
stetson_k  =  0.810977170806
weighted_mean  =  15.864220531
weighted_std  =  0.17602711957
