-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.42


######### Lightcurve features #########

amplitude  =  0.310401213577
cusum  =  0.403906071097
eta  =  0.219856991478
hl_amp_ratio  =  2.08419638104
kurtosis  =  -1.08683357057
n_points  =  536
period  =  0.645035810277
period_SNR  =  18.94635112
period_log10FAP  =  -16.7472828834
period_uncertainty  =  0.000111830067422
phase_cusum  =  0.17223227875
phase_eta  =  1.203537345
phi21  =  -1.9122098292
phi31  =  -1.53553714352
quartile31  =  0.77
r21  =  0.538922792932
r31  =  0.483123401059
shapiro_w  =  0.942432701588
skewness  =  0.234272456534
slope_per10  =  -0.0660780587038
slope_per90  =  0.0735754254676
stetson_k  =  0.793851864688
weighted_mean  =  12.833543096
weighted_std  =  0.449694242759
