-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.311401920268
cusum  =  0.102981653912
eta  =  0.603360058323
hl_amp_ratio  =  0.323953087156
kurtosis  =  -0.811890865896
n_points  =  261
period  =  0.611793544437
period_SNR  =  40.7937774338
period_log10FAP  =  -34.7053411328
period_uncertainty  =  0.000129152115622
phase_cusum  =  0.320767863774
phase_eta  =  0.342711285312
phi21  =  0.880061774325
phi31  =  1.76679290799
quartile31  =  0.41
r21  =  0.386051931489
r31  =  0.234512231329
shapiro_w  =  0.902275323868
skewness  =  -0.668854494405
slope_per10  =  -0.15119770295
slope_per90  =  0.141503348631
stetson_k  =  0.743361126708
weighted_mean  =  14.6392268272
weighted_std  =  0.280721996087
