-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.99


######### Lightcurve features #########

amplitude  =  0.293688563326
cusum  =  0.189669453356
eta  =  0.625835952802
hl_amp_ratio  =  0.759953578542
kurtosis  =  -0.852554382387
n_points  =  186
period  =  0.54972865582
period_SNR  =  24.0966546909
period_log10FAP  =  -19.9164421483
period_uncertainty  =  0.000124228460203
phase_cusum  =  0.231905653274
phase_eta  =  0.167105854956
phi21  =  0.712874636824
phi31  =  -1.18221705902
quartile31  =  0.42
r21  =  0.404162911102
r31  =  0.308524225687
shapiro_w  =  0.958782911301
skewness  =  -0.328773009962
slope_per10  =  -0.159050685788
slope_per90  =  0.218792010303
stetson_k  =  0.832455761086
weighted_mean  =  14.8069971905
weighted_std  =  0.26264733885
