-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.81


######### Lightcurve features #########

amplitude  =  0.164169679154
cusum  =  0.151289269824
eta  =  0.529218994566
hl_amp_ratio  =  0.519419643031
kurtosis  =  -0.156819158443
n_points  =  313
period  =  0.640640712552
period_SNR  =  38.8925009154
period_log10FAP  =  -40.7820071148
period_uncertainty  =  0.000114342959261
phase_cusum  =  0.210408256478
phase_eta  =  0.435941052602
phi21  =  -2.52672512251
phi31  =  -2.32937858513
quartile31  =  0.17
r21  =  0.305758012986
r31  =  0.044290696318
shapiro_w  =  0.952733099461
skewness  =  -0.672027329914
slope_per10  =  -0.200506190339
slope_per90  =  0.297052362224
stetson_k  =  0.774145635426
weighted_mean  =  14.7852588812
weighted_std  =  0.126199633742
