-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.277022883858
cusum  =  0.141296953565
eta  =  0.773780845368
hl_amp_ratio  =  0.49502053166
kurtosis  =  -0.580677451764
n_points  =  162
period  =  0.559407786611
period_SNR  =  25.4810330102
period_log10FAP  =  -18.5850467489
period_uncertainty  =  0.000165353076412
phase_cusum  =  0.306229353188
phase_eta  =  0.294572603042
phi21  =  -2.45024516739
phi31  =  -1.12412720895
quartile31  =  0.395
r21  =  0.413806890023
r31  =  0.26398347156
shapiro_w  =  0.951269984245
skewness  =  -0.538332343951
slope_per10  =  -0.116491632156
slope_per90  =  0.221653138278
stetson_k  =  0.769576786321
weighted_mean  =  16.7728492076
weighted_std  =  0.24738281006
