-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.99


######### Lightcurve features #########

amplitude  =  0.119315056079
cusum  =  0.108137929467
eta  =  1.16023259401
hl_amp_ratio  =  1.07505143018
kurtosis  =  -0.169837248622
n_points  =  350
period  =  0.774338585867
period_SNR  =  35.1237247166
period_log10FAP  =  -23.7198828072
period_uncertainty  =  0.000167214870116
phase_cusum  =  0.244969556076
phase_eta  =  1.06125587734
phi21  =  -1.64910681323
phi31  =  -2.88771397157
quartile31  =  0.1975
r21  =  0.366665409183
r31  =  0.177352584086
shapiro_w  =  0.994314551353
skewness  =  0.165173272877
slope_per10  =  -0.110972106631
slope_per90  =  0.131175983798
stetson_k  =  0.809383277841
weighted_mean  =  17.8360926745
weighted_std  =  0.131464329452
