-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.99


######### Lightcurve features #########

amplitude  =  0.302835763298
cusum  =  0.095891666946
eta  =  0.664005612368
hl_amp_ratio  =  0.303959960817
kurtosis  =  -0.206949550643
n_points  =  243
period  =  0.653444983147
period_SNR  =  34.513624894
period_log10FAP  =  -28.853534575
period_uncertainty  =  0.000146830578116
phase_cusum  =  0.237556396166
phase_eta  =  0.449886358575
phi21  =  4.06280968302
phi31  =  4.92926918971
quartile31  =  0.37
r21  =  0.361514037458
r31  =  0.235806803311
shapiro_w  =  0.873745620251
skewness  =  -0.88471505628
slope_per10  =  -0.156481135944
slope_per90  =  0.295665047057
stetson_k  =  0.72929958359
weighted_mean  =  13.7750101148
weighted_std  =  0.260351604357
