-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.85


######### Lightcurve features #########

amplitude  =  0.515032139919
cusum  =  0.107963184302
eta  =  0.684410664174
hl_amp_ratio  =  0.358436342177
kurtosis  =  -0.850111130989
n_points  =  244
period  =  0.662733245044
period_SNR  =  31.4285851411
period_log10FAP  =  -26.2728096325
period_uncertainty  =  0.000131400838697
phase_cusum  =  0.25771906531
phase_eta  =  0.341112463924
phi21  =  -2.47431647875
phi31  =  -1.49312988107
quartile31  =  0.7725
r21  =  0.530811584931
r31  =  0.287549147702
shapiro_w  =  0.85833543539
skewness  =  -0.756495622138
slope_per10  =  -0.0885407529867
slope_per90  =  0.323014043955
stetson_k  =  0.74409206922
weighted_mean  =  12.6914197267
weighted_std  =  0.510096095922
