-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.162117545936
cusum  =  0.146759952352
eta  =  0.486415471506
hl_amp_ratio  =  0.746815925889
kurtosis  =  -0.910332201314
n_points  =  382
period  =  0.635816673996
period_SNR  =  50.0423503954
period_log10FAP  =  -55.8189327883
period_uncertainty  =  0.000112757447186
phase_cusum  =  0.29864305563
phase_eta  =  0.228785018106
phi21  =  1.0451770556
phi31  =  2.2693321382
quartile31  =  0.2475
r21  =  0.428324353114
r31  =  0.237985252026
shapiro_w  =  0.955609798431
skewness  =  -0.119421869916
slope_per10  =  -0.249953325492
slope_per90  =  0.312333179188
stetson_k  =  0.859076913952
weighted_mean  =  15.5186472413
weighted_std  =  0.135304721532
