-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  DSCT
class_probability =  0.47


######### Lightcurve features #########

amplitude  =  0.261551415506
cusum  =  0.130566906875
eta  =  0.889592416403
hl_amp_ratio  =  1.0323311995
kurtosis  =  -0.983860694725
n_points  =  101
period  =  0.203895027299
period_SNR  =  22.4187495716
period_log10FAP  =  -11.3836447135
period_uncertainty  =  1.70893124945e-05
phase_cusum  =  0.257724172361
phase_eta  =  0.31845470794
phi21  =  3.16588954183
phi31  =  4.57128034492
quartile31  =  0.27
r21  =  0.209007489707
r31  =  0.086166873297
shapiro_w  =  0.972136378288
skewness  =  0.00238100021767
slope_per10  =  -0.0993048496824
slope_per90  =  0.217095777772
stetson_k  =  0.842739891946
weighted_mean  =  9.62306930693
weighted_std  =  0.175379320582
