-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.308565009381
cusum  =  0.154895525525
eta  =  0.592184161541
hl_amp_ratio  =  0.655184205502
kurtosis  =  -0.845288405651
n_points  =  248
period  =  0.577643170893
period_SNR  =  35.0973049002
period_log10FAP  =  -29.0233356329
period_uncertainty  =  0.000114740752238
phase_cusum  =  0.283040222014
phase_eta  =  0.367764236452
phi21  =  -2.04245492372
phi31  =  -0.545811158289
quartile31  =  0.4425
r21  =  0.431698246332
r31  =  0.206607291735
shapiro_w  =  0.964128911495
skewness  =  -0.366803383773
slope_per10  =  -0.168307930967
slope_per90  =  0.143854289316
stetson_k  =  0.814551432537
weighted_mean  =  15.4024191469
weighted_std  =  0.269743556968
