-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.98


######### Lightcurve features #########

amplitude  =  0.327788149312
cusum  =  0.133249597941
eta  =  0.766680636989
hl_amp_ratio  =  0.542297626548
kurtosis  =  -0.0652905557633
n_points  =  220
period  =  0.577616867533
period_SNR  =  33.834985765
period_log10FAP  =  -26.5037064571
period_uncertainty  =  0.000114372032905
phase_cusum  =  0.223802874331
phase_eta  =  0.329829011399
phi21  =  -2.39860046176
phi31  =  -4.37467996504
quartile31  =  0.345
r21  =  0.398484168574
r31  =  0.206066215757
shapiro_w  =  0.936137795448
skewness  =  -0.786176637639
slope_per10  =  -0.125894235564
slope_per90  =  0.289609634896
stetson_k  =  0.769087889407
weighted_mean  =  13.9397789681
weighted_std  =  0.241389191291
