-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.350195866781
cusum  =  0.160394403527
eta  =  0.519044883313
hl_amp_ratio  =  0.486056613973
kurtosis  =  -0.28498921459
n_points  =  261
period  =  0.615518446726
period_SNR  =  34.6451579592
period_log10FAP  =  -29.7072625794
period_uncertainty  =  0.000130729587503
phase_cusum  =  0.237350285949
phase_eta  =  0.0613620971911
phi21  =  -2.18456592837
phi31  =  -1.06053885056
quartile31  =  0.38
r21  =  0.551522515484
r31  =  0.322993318468
shapiro_w  =  0.915235221386
skewness  =  -0.807117241889
slope_per10  =  -0.193249993026
slope_per90  =  0.271333327206
stetson_k  =  0.74909558986
weighted_mean  =  13.7216763722
weighted_std  =  0.299186875619
