-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.85


######### Lightcurve features #########

amplitude  =  0.245179580753
cusum  =  0.107444085475
eta  =  0.595911023289
hl_amp_ratio  =  0.383597772519
kurtosis  =  -1.112098801
n_points  =  261
period  =  0.555930562056
period_SNR  =  35.10561176
period_log10FAP  =  -29.649193096
period_uncertainty  =  0.000106643119607
phase_cusum  =  0.221065778797
phase_eta  =  0.302476197872
phi21  =  1.05992668709
phi31  =  2.42966792495
quartile31  =  0.4
r21  =  0.486168924927
r31  =  0.302779310446
shapiro_w  =  0.909224927425
skewness  =  -0.494169787408
slope_per10  =  -0.156037008162
slope_per90  =  0.182561766762
stetson_k  =  0.7758502234
weighted_mean  =  14.1129059112
weighted_std  =  0.242202308943
