-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.89


######### Lightcurve features #########

amplitude  =  0.298289059811
cusum  =  0.169803649583
eta  =  0.483833007557
hl_amp_ratio  =  0.544162724098
kurtosis  =  -1.45915371192
n_points  =  282
period  =  0.561528808731
period_SNR  =  21.6896459045
period_log10FAP  =  -39.6646838969
period_uncertainty  =  0.000103871407315
phase_cusum  =  0.392951472157
phase_eta  =  0.0625647295115
phi21  =  0.929117279768
phi31  =  1.9007062179
quartile31  =  0.53
r21  =  0.458135663549
r31  =  0.370893417222
shapiro_w  =  0.885865807533
skewness  =  -0.302669174968
slope_per10  =  -0.178470401233
slope_per90  =  0.333306867172
stetson_k  =  0.876450467115
weighted_mean  =  13.9145937691
weighted_std  =  0.28111244485
