-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.89


######### Lightcurve features #########

amplitude  =  0.304268749609
cusum  =  0.111897794242
eta  =  0.672510999989
hl_amp_ratio  =  0.300214777705
kurtosis  =  -1.30451075371
n_points  =  186
period  =  0.578722704411
period_SNR  =  24.3767526884
period_log10FAP  =  -19.5711668404
period_uncertainty  =  0.000137678736931
phase_cusum  =  0.305921117147
phase_eta  =  0.491074560308
phi21  =  0.487215666732
phi31  =  -1.12777911546
quartile31  =  0.5775
r21  =  0.470000085041
r31  =  0.343849364112
shapiro_w  =  0.878150582314
skewness  =  -0.466705004501
slope_per10  =  -0.13905647751
slope_per90  =  0.431034492609
stetson_k  =  0.769145192782
weighted_mean  =  14.4760911824
weighted_std  =  0.318795245225
