-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.93


######### Lightcurve features #########

amplitude  =  0.176764983948
cusum  =  0.111917263842
eta  =  0.651046187357
hl_amp_ratio  =  0.729281717427
kurtosis  =  -0.823322180543
n_points  =  356
period  =  0.614333272565
period_SNR  =  44.0370453013
period_log10FAP  =  -47.6756606788
period_uncertainty  =  0.000105251728666
phase_cusum  =  0.235297521787
phase_eta  =  0.525787091743
phi21  =  1.04215880066
phi31  =  -0.147559402745
quartile31  =  0.24
r21  =  0.307191619345
r31  =  0.116051178756
shapiro_w  =  0.95921343565
skewness  =  -0.222635815822
slope_per10  =  -0.177453164405
slope_per90  =  0.170648896225
stetson_k  =  0.866047506714
weighted_mean  =  14.9710630301
weighted_std  =  0.147321911581
