-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.276755183151
cusum  =  0.0668580888494
eta  =  0.608968555643
hl_amp_ratio  =  0.456066702083
kurtosis  =  -0.512882449851
n_points  =  367
period  =  0.671843560186
period_SNR  =  43.315455112
period_log10FAP  =  -47.5073041719
period_uncertainty  =  0.000125879409209
phase_cusum  =  0.236968318465
phase_eta  =  0.185648486174
phi21  =  0.926040643623
phi31  =  2.17728078972
quartile31  =  0.37
r21  =  0.517163922108
r31  =  0.321494831364
shapiro_w  =  0.935871422291
skewness  =  -0.654746566179
slope_per10  =  -0.146578445879
slope_per90  =  0.207809407389
stetson_k  =  0.754493848661
weighted_mean  =  16.3245693452
weighted_std  =  0.246047808953
