-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  CEPH_1O
class_probability =  0.38


######### Lightcurve features #########

amplitude  =  0.28778354705
cusum  =  0.171127462959
eta  =  0.690232009413
hl_amp_ratio  =  0.537077286024
kurtosis  =  -1.1142973974
n_points  =  64
period  =  0.580314674884
period_SNR  =  10.7436559086
period_log10FAP  =  -5.31884547548
period_uncertainty  =  0.000214122482009
phase_cusum  =  0.269635281048
phase_eta  =  0.522220430925
phi21  =  3.55675252592
phi31  =  5.4110956913
quartile31  =  0.445
r21  =  0.230377503565
r31  =  0.218807434568
shapiro_w  =  0.942377924919
skewness  =  -0.310390422432
slope_per10  =  -0.288031357584
slope_per90  =  0.694199986756
stetson_k  =  0.835963707656
weighted_mean  =  13.072173913
weighted_std  =  0.255855878619
