-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.98


######### Lightcurve features #########

amplitude  =  0.248197242882
cusum  =  0.156426431554
eta  =  0.675054979896
hl_amp_ratio  =  0.564974814107
kurtosis  =  -0.880957033853
n_points  =  175
period  =  0.705038093069
period_SNR  =  22.5615797159
period_log10FAP  =  -18.1858674736
period_uncertainty  =  0.00023347567367
phase_cusum  =  0.331396215419
phase_eta  =  0.296433504997
phi21  =  0.947470504218
phi31  =  2.05997216501
quartile31  =  0.37
r21  =  0.57888210182
r31  =  0.23653265319
shapiro_w  =  0.955095887184
skewness  =  -0.318220338726
slope_per10  =  -0.215918345011
slope_per90  =  0.343696631984
stetson_k  =  0.785997662964
weighted_mean  =  15.4960418139
weighted_std  =  0.222582582275
