-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  CEPH_Other
class_probability =  0.37


######### Lightcurve features #########

amplitude  =  0.23784586164
cusum  =  0.19253572237
eta  =  0.390778348286
hl_amp_ratio  =  0.781547302849
kurtosis  =  -1.33549936403
n_points  =  289
period  =  0.381107564753
period_SNR  =  41.4145195054
period_log10FAP  =  -45.6471517331
period_uncertainty  =  4.13348773381e-05
phase_cusum  =  0.22233844055
phase_eta  =  0.309957644666
phi21  =  -1.28639755576
phi31  =  -4.45281659594
quartile31  =  0.36
r21  =  0.0950986277244
r31  =  0.0483333070805
shapiro_w  =  0.91900318861
skewness  =  -0.221208932306
slope_per10  =  -0.111408289486
slope_per90  =  0.155495686554
stetson_k  =  0.885170746929
weighted_mean  =  12.8793105446
weighted_std  =  0.186372767712
