-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.97


######### Lightcurve features #########

amplitude  =  0.372669777425
cusum  =  0.167400565034
eta  =  0.632153591349
hl_amp_ratio  =  0.39060792958
kurtosis  =  0.308470602747
n_points  =  298
period  =  0.484410738222
period_SNR  =  45.7841693334
period_log10FAP  =  -36.8694522374
period_uncertainty  =  0.000107134968581
phase_cusum  =  0.257866268449
phase_eta  =  0.25417464108
phi21  =  0.781623782165
phi31  =  1.78095804108
quartile31  =  0.3675
r21  =  0.454240355654
r31  =  0.281844326074
shapiro_w  =  0.90793722868
skewness  =  -0.995517105492
slope_per10  =  -0.0880106313135
slope_per90  =  0.108909164137
stetson_k  =  0.709952699391
weighted_mean  =  16.3819006779
weighted_std  =  0.281744900076
