-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  DSCT
class_probability =  0.43


######### Lightcurve features #########

amplitude  =  0.314787981037
cusum  =  0.271326342716
eta  =  1.50742864348
hl_amp_ratio  =  0.688538541678
kurtosis  =  -1.23874126611
n_points  =  12
period  =  0.0317745631399
period_SNR  =  5.04996495882
period_log10FAP  =  0.0
period_uncertainty  =  2.57880063966e-07
phase_cusum  =  0.318554765881
phase_eta  =  1.18663874384
phi21  =  -3.83731398609
phi31  =  -5.78661339677
quartile31  =  0.36
r21  =  0.110729691385
r31  =  0.110847818297
shapiro_w  =  0.922144770622
skewness  =  -0.289229336153
slope_per10  =  -0.0193838042134
slope_per90  =  0.0678067712752
stetson_k  =  0.790040556299
weighted_mean  =  13.9701204819
weighted_std  =  0.211736901849
