-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.99


######### Lightcurve features #########

amplitude  =  0.304966660627
cusum  =  0.0762970721293
eta  =  0.544269481863
hl_amp_ratio  =  0.510564753189
kurtosis  =  -0.983843581746
n_points  =  790
period  =  0.660921442762
period_SNR  =  79.4153330441
period_log10FAP  =  -107.009879037
period_uncertainty  =  0.000116408599134
phase_cusum  =  0.247008829621
phase_eta  =  0.362626211862
phi21  =  -2.18265037099
phi31  =  -0.875488132007
quartile31  =  0.4575
r21  =  0.400068358011
r31  =  0.235126343751
shapiro_w  =  0.921559095383
skewness  =  -0.521582816278
slope_per10  =  -0.0548141892489
slope_per90  =  0.0645398568319
stetson_k  =  0.825829239885
weighted_mean  =  13.8294737806
weighted_std  =  0.27219193198
