-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.99


######### Lightcurve features #########

amplitude  =  0.313202753666
cusum  =  0.185970718415
eta  =  0.676511044571
hl_amp_ratio  =  0.157508511474
kurtosis  =  -0.220007375032
n_points  =  170
period  =  0.51214407976
period_SNR  =  23.5405328464
period_log10FAP  =  -19.9462942369
period_uncertainty  =  0.00010345748302
phase_cusum  =  0.26058755486
phase_eta  =  0.117358612236
phi21  =  -2.35967045534
phi31  =  -4.71357370439
quartile31  =  0.36
r21  =  0.401360392758
r31  =  0.353404466235
shapiro_w  =  0.834210574627
skewness  =  -1.00327302914
slope_per10  =  -0.186359278933
slope_per90  =  0.376995054223
stetson_k  =  0.657657535175
weighted_mean  =  13.1501176471
weighted_std  =  0.249505365344
