<html><head><meta name="color-scheme" content="light dark"></head><body><pre style="word-wrap: break-word; white-space: pre-wrap;">-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_c
class_probability =  0.93


######### Lightcurve features #########

amplitude  =  0.185912387924
cusum  =  0.102987659011
eta  =  0.689268715188
hl_amp_ratio  =  1.06202108038
kurtosis  =  -1.32090034405
n_points  =  383
period  =  0.351411876666
period_SNR  =  58.2215806158
period_log10FAP  =  -63.0638625395
period_uncertainty  =  3.44426902328e-05
phase_cusum  =  0.250564175567
phase_eta  =  0.307020580155
phi21  =  2.17126205414
phi31  =  3.93147393677
quartile31  =  0.255
r21  =  0.120767138361
r31  =  0.0668318595041
shapiro_w  =  0.941455543041
skewness  =  0.0396111983186
slope_per10  =  -0.0717094913481
slope_per90  =  0.108413359207
stetson_k  =  0.877851557841
weighted_mean  =  16.4093927104
weighted_std  =  0.135253600177
</pre></body></html>